<template>
  <MenuRow row-title="2D Cellular Automata">
    <div class="form-field">
      <input
        id="start2d"
        type="button"
        name="start2d"
        value="start"
      >
      <input
        type="button"
        name="stop"
        class="stop"
        value="stop"
      >
      <input
        type="button"
        name="reset"
        class="reset"
        value="reset"
      >
    </div>
  </MenuRow>
</template>

<script>
import MenuRow from './MenuRow.vue'
export default {
  name: 'Menu2dCA',
  components: {
    MenuRow
  }
}
</script>
